% Definition of Laboratory for Computer Science Research letterhead.
% These letterheads are for use on Postscript printers and require that a
%   file containing the Ruters logo be in the appropriate directory.
% Use \letterhead when using corrdefs.tex to format a letter or memo.
% Use \saletterhead as a stand alone letterhead.
\input psfig

\def\letterhead{{\parskip=0pt\offinterlineskip\global\pageno=1
  \font\little=h-med at 9 truept
  \null
  \ifwindow\else\vskip0pt plus-60pt\fi\ifheadline\vskip-12pt\fi
  \vskip-10pt\vskip-.47truein
  \vbox to 87truept{\line
       {\hfil\psfig{figure=/usr/local/lib/tex/rlogo.ps,prolog=/usr/local/lib/tex/lcsrlogo.pro}\hfil}
  \vss}}
   \typeout{NOTE!! You must run dvitps manually on this document before}
   \typeout{you print it. The letterhead will look best if printed on}
   \typeout{something other than a LaserWriterI (eg., LaserWriter Plus).}
   }

\def\saletterhead{\hoffset-.12truein
  {\parskip=0pt\offinterlineskip\global\pageno=1
  \font\little=h-med at 9 truept
  \null\vskip-10pt\vskip-.47truein
  \vbox to 83.26141truept{\line
       {\hfil\psfig{figure=/usr/local/lib/tex/rlogo.ps,prolog=/usr/local/lib/tex/lcsrlogo.pro}\hfil}
  \vss}}
   \typeout{NOTE!! You must run dvitps manually on this document before}
   \typeout{you print it. The letterhead will look best if printed on}
   \typeout{something other than a LaserWriterI (eg., LaserWriter Plus).}
   }
